                            AUTOLOGGER

   The AutoLogger, when enabled, will automatically log all activity
to the path specified in the configuration file. If no path is
specified then the current directory is used. The program develops
the file name (YYMMDDHH.log)

   Pressing F9 will pop up the AutoLogger Menu. There are three  
selections available: log activity, an extended logging option, and
a print while logging option. The log activity selection toggles the
logger on and off. A checkmark in front of an option indicates that
it has been enabled.

   If the extended logging option is enabled, the auxiliary hardware
inputs and outputs are logged (in addition to the standard data).

   If the print while logging option is selected with the printer not
available (off-line, out of paper, etc.) an error message is shown.
The option must be reselected once the problem is corrected. Printer
problems while trying to print a log entry will result in automatic
de-selection of the print option. No error messages are generated in
this case.
  
   The current or last log entry may be viewed on the Status display
selected from the Page Menu (F10) or with the left/right arrow keys
(see Page Selection help item).

