                            AUTOPROGRAM

   The AutoProgram function allows the user to program the scanner
from a file.  The format of an autoprogram file is described in the
User's Manual.

   Pressing F4 will pop up the AutoProgram Menu. Four Options are
available. The options are as follows:

        A - Option A will program each line of the file into the
            channels indicated in the file. File entries without
            channel numbers indicated will be programmed in the
            next available channel. If the first file entries do
            not have  channel numbers indicated, programming starts
            with channel number one. After selecting AutoProgramming
            with this option enabled, a dialog box will appear to
            allow selection of the file to use.

        B - Option B ignores any channel numbers indicated in the
            file. The user will be asked to enter a starting channel
            number after selecting a file.

        C - Option C is the same as Option A except that only file
            entries marked with a specific "filter" character(s) are
            programmed. Entries without the filter are ignored. After
            selecting the file to use, the user is asked to enter
            the filter character(s). This filter may be up to twelve
            characters in length.

        D - Option D is the same as Option B except that the file is
            "filtered" as in Option C.

    Option A is considered the default (or standard) method of
autoprogramming the scanner. Selecting a different option diables the
previously selected option. The program allows only one of the four
options to be active at any given time.


