                          Command Switches 
                          
   The HB232 program may be started with several command line options
as follows:

  ?   - Displays the command line options available.

  /b  - Forces mono display.   

  /n  - Loads existing configuration file but puts user in the Setup
           utility so that it can be modified before using.
      
  /r  - Bypasses calling HBoot. If the Interface Unit has not been 
           turned off since being initialized, calling HBoot can be 
           skipped. This switch saves a few seconds during the start 
           up but is not required since HBoot can determine if an 
           initialization is necessary.

  /s  filename  - Starts a script when the program starts. Be sure 
           and put a space before and after the script filename. If
           no path is specified the script path in the config file
           is used.

  /x  - Overides the feature which locates the support files (config,  
           per, help, etc.) when the program is started from a 
           directory other than the main program's directory. Used
           by the programer as a debugging aid. Left in just in case
           some user may have a need for it.

Example - To start the program with the /n switch, enter:
                           HB232V12  /N
          Don't forget the space between the program name and the 
          switches.

