                               MISC MENU

   The Misc Menu allows the user to toggle the user switches on and
off. See the Installation and User's Manuals for more information
about the user's switches.

   Pressing F2 pops up the Misc Menu. In addition to the user's
switches, Quit may be selected from this menu.

    Note: "Q" will quit the program when a menu is not selected.



