                          PAGE SELECTION

   The HB232 Scanner Interface Program defaults to a display of a 
Keypad matrix to aid the user in finding PC Keys equivalent to the 
Scanner's Keys. This area of the display may be replaced with other 
screens or pages of information. The Left and Right Arrow Keys will 
rotate among the available pages. The other pages may also be 
selected from the Page Selection Menu.

   Pressing F10 pops up the Page Selection Menu. Available pages
are as follows:

        Keypad display - The default page seen after first starting
          the program.

        Status display - A page providing general status information
          such as log entry, autolog path, script filename, etc.

        script Msg display - A page showing messages generated by a
          script. This page is automatically displayed if a script
          generates a message. Once the message is displayed other
          pages may be selected.

        Lookup display - A page showing information found by the
          lookup function. This page is also automatically shown
          as in the script message page and may be changed to a
          different page after the information is displayed.



