                               Reject

   The Reject function automatically "rejects" (resumes scanning or
searching) when activity is detected on a frequency that is on the 
Reject List. The List is initially empty and may be loaded from a 
file and/or added to while the program is running. 

   Pressing F7 pops up the Reject Menu. The available functions are
as follows:

        Reject listed activity - This item toggles reject checking
          on and off. This must be on to enable rejection of
          unwanted frequencies, however, it does not have to be on
          to perform any other Reject List functions.

        Add freq - Selecting this item will add the currently
          displayed scanner frequency to the Reject List.

        Clear freq - Clears the last freq on the Reject List.

        Save - Saves Reject List to a file. The user is asked for a
          filename. If no path is entered with the filename, then 
          file will be saved to the path specified in the setup.

        Load - Loads the Reject List from a file.

        Erase list - Erases the entire list.

        View reject list - This item pops up a window showing the
          Reject List. Selected frequencies may be deleted and the
          List saved while viewing the List.

NOTE: A quick and easy way to add a specific frequency to the list
is to pick a channel in program mode and enter the desired freq. 
Then select the Add Freq item above. After adding the freq to the
list, another freq may be entered into the same channel and the
process repeated. An entire list can be developed this way if desired.
Don't forget to save the list if you want to keep it. The program
will NOT prompt you to save the list.

