                               SCRIPTS

   Scripts allow the user to automate various scanner operations via
a text file. See the User's Manual for more detail concerning script
commands and format.

   Pressing F5 pops up the Script Menu. Available selections are as
follows:

        run Script file - This item actually starts a script running
          after asking the user to select the filename.

        Abort script - Terminates a script in progress.

        Pause/continue - Pauses a script while it is running.
          The script may be continued by reselecting this item.

        Option: view script line  -  This option, if enabled, causes
          the currently executing script line to be displayed at the
          bottom of the screen. This is useful for debugging scripts.

NOTE: Commonly used scripts may be added to the script section of the
Tools function via the setup utility. The script may then be activated
without having to go through the file selection process.

