                               TOOLS

   The user may launch programs such as text editors, databases,
file managers or scripts from within the HB232 program. The user 
defines what programs/scripts to run in the setup utility. Program
tools allow the HB232 Program to remain resident in memory and pop
back immediately when the user's program is terminated. A selection
is also provided to Shell to DOS.

   Pressing F8 pops up the Tools Menu. Selections available are the
actual names of the programs defined by the user in the config file.
Four program tools, four script tools, and a DOS shell tool are
provided.

NOTE: Since the HB232 remains resident in memory when calling other
programs, large programs may not work. Scripts called from the Tools
Menu function just as if they had been called from the Script Menu.

